The Machine API provides means to control the host machine.

\section{Functions}

\begin{tabularx}{\textwidth}{l l X}
	\textbf{\large Function} & \textbf{\large Return} & \textbf{\large Description}
	\\ \\
	\endhead
	machine.milliTime() & int & Returns how many time the machine is up, in milliseconds (one thousandth of seconds).
\end{tabularx}