\thismachine\ is a virtual machine programmable using mainly, but not limited to, Javascript, and can have 7 virtual peripherals that can be communicated using MMIOs exclusively. \thismachine\ has default graphics of 80-column 32-rows text mode with one 560\times448 pixels framebuffer with 256 palette colours with 4096 colours to choose from.

This is the documentation for \thismachine\ \tsvmver.
